00 . 2 0 . 4 0 . 6 0 . 8 14 7 5 0 4 8 0 0 4 8 5 0 4 9 0 0 4 9 5 0 5 0 0 0 5 0 5 0 5 1 0 0 5 1 5 0

F

l

(10

-15 erg s

-1 cm

-2

�

)wavelength (�)nucleus

PA=48�Hb[OIII]