1 2 5 0 1 3 0 0 1 3 5 0 1 4 0 0 1 4 5 0 1 5 0 0 1 5 5 0 1 6 0 0 0 . 0 0 . 2 0 . 4 0 . 6 0 . 8 1 . 0 1 . 2 velocity (km/s)

H

a

Flux (10

-15 erg s

-1 cm

-2

�

)48�NES W ABB ’

12501300135014001450150015500.00.20.40.60.8 velocity (km s

-1

)

H a

)84�EWCC ’

12501300135014001450150015500.00.51.01.5-100-5005 0 100 velocity (km s

-1

)

H a

Flux (10

-15 erg s

-1 cm

-2

�

)distance (arcsec)138�S E NW

12501300135014001450150015501600-8-6-4-202468