0 . 0 0 0 . 0 5 0 . 1 0 0 . 1 5 0 . 2 0 0 . 2 5 - 8 - 6 - 4 - 2 02468

Hb[OIII] 5007

Flux (10

-15 erg s

-1 cm

-2

)distance (arcsec)p.a.=138o